0 2 4 6 8 10 12 14 16 18 20 22 24 -2

-1

0

1

2

MST

Strg_co2 (umol/m2/s)

Jan-Jun, 2001

0 2 4 6 8 10 12 14 16 18 20 22 24 -2

-1

0

1

2

MST

Jul-Dec, 2001